From bdba5366937f603dddb6a0531e68299959ca61be Mon Sep 17 00:00:00 2001
From: Mohammad Akhlaghi <mohammad@akhlaghi.org>
Date: Sat, 7 Sep 2019 00:41:01 +0100
Subject: Updates in BibLaTeX preamble

In some cases, users of the template may not need the other template
headers, they may only want `preamble-biblatex.tex'. But `xcolor' needs to
be loaded before being able to load the various colors we use in the
references. So to be self-consistent, it is loaded.

Also, the default style was also printing the month of the publication
which is not common. So a line was added to clear the `month' field before
building the Bibliography.
---
 tex/src/preamble-biblatex.tex | 8 ++++++++
 1 file changed, 8 insertions(+)

(limited to 'tex/src/preamble-biblatex.tex')

diff --git a/tex/src/preamble-biblatex.tex b/tex/src/preamble-biblatex.tex
index da3aa6f..71ee71e 100644
--- a/tex/src/preamble-biblatex.tex
+++ b/tex/src/preamble-biblatex.tex
@@ -46,6 +46,13 @@
 
 
 
+%% To define colors
+\usepackage{xcolor}
+
+
+
+
+
 % Basic BibLaTeX settings
 \usepackage[
     doi=false,
@@ -65,6 +72,7 @@
 \addbibresource{tex/src/references.tex}
 \addbibresource{tex/build/macros/dependencies-bib.tex}
 \renewbibmacro{in:}{}
+\AtEveryBibitem{\clearfield{month}}
 \renewcommand*{\bibfont}{\footnotesize}
 \DefineBibliographyStrings{english}{references = {References}}
 
-- 
cgit v1.2.1

