From 2af60e2d59c508c182a10ebc0de31b035b73cae8 Mon Sep 17 00:00:00 2001
From: Mohammad Akhlaghi <mohammad@akhlaghi.org>
Date: Sat, 11 Aug 2018 11:59:04 +0200
Subject: Not using random distribution in demonstration plot

Different implementations of AWK may use different random number
generators, so even setting the seed will not ensure a reproducible
result. Because of this, the random plot may be different when the
pipeline runs on different systems and this can confuse early users
(its contrary to the exact reproducibility that is the whole purpose
of this pipeline).

The plot is just a simple X^2 plot, showing the squared value of the X
axis on the Y axis. It is very simple, but atleast it will be
identical on all systems. Also, there may be too many complicated
things in the pipeline already for an early user, and its just a
demonstration, so the easier/simpler, the better.
---
 tex/delete-me.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'tex/delete-me.tex')

diff --git a/tex/delete-me.tex b/tex/delete-me.tex
index 495333a..32be11c 100644
--- a/tex/delete-me.tex
+++ b/tex/delete-me.tex
@@ -5,8 +5,8 @@
   %% Settings of the plotted axis
   \begin{axis}[
       width=\linewidth,
-      xlabel=Counter,
-      ylabel=Random value,
+      xlabel=$X$,
+      ylabel=$X^2$,
     ]
 
     %% A particular plot.
-- 
cgit v1.2.1

