From 65633b48a02cee909c822dfb96f79b21bdc447c8 Mon Sep 17 00:00:00 2001
From: Mohammad Akhlaghi <mohammad@akhlaghi.org>
Date: Sun, 15 May 2022 16:15:13 +0200
Subject: Corrected repeated word in title of one slide in short slides

Until now, the word "Observatorio" was repeated in the title of the
slide on J-PAS!

With this commit, the extra repetition has been removed.
---
 slides-intro-short.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'slides-intro-short.tex')

diff --git a/slides-intro-short.tex b/slides-intro-short.tex
index 4c920c3..fc4ac1b 100644
--- a/slides-intro-short.tex
+++ b/slides-intro-short.tex
@@ -96,7 +96,7 @@
 
 
   %% Introduction to OAJ and J-PAS
-  \begin{frame}{Our main project: \textbf{J-PAS} with Observatorio Observatorio Astrofísico de Javalambre (OAJ)}
+  \begin{frame}{Our main project: \textbf{J-PAS} with Observatorio Astrof\'isico de Javalambre (OAJ)}
     J-PAS will observe the northern sky in \alert{56 medium-band filters} ($\sim14$nm):
 
     \begin{center}
-- 
cgit v1.2.1

