From ad2c476d0bf3f9573b720b1720a16ae1bd225828 Mon Sep 17 00:00:00 2001
From: Mohammad Akhlaghi <mohammad@akhlaghi.org>
Date: Fri, 16 Aug 2019 00:40:57 +0530
Subject: Minor typo correction in NoiseChisel demo slide

I had used two `using's in one sentence. The second is now changed to
`with'.
---
 reproducible-paper.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'reproducible-paper.tex')

diff --git a/reproducible-paper.tex b/reproducible-paper.tex
index 2101e02..574d56e 100644
--- a/reproducible-paper.tex
+++ b/reproducible-paper.tex
@@ -104,7 +104,7 @@
     \small
     \begin{columns}
       \column{6cm} Example: Outer surface brightness of M51 in a
-      \alert{single-exposure} SDSS image, using NoiseChisel, using
+      \alert{single-exposure} SDSS image, using NoiseChisel, with
       default and optimized parameters.
 
       \vspace{2mm}
-- 
cgit v1.2.1

