From 01ce2ccc075a9660186ca58683db93b1c06bf3e4 Mon Sep 17 00:00:00 2001
From: Mohammad Akhlaghi <mohammad@akhlaghi.org>
Date: Mon, 1 Jul 2019 00:10:05 +0100
Subject: Corrected extra line in the schrodinger's code paper title

The new-line was manually inserted in the old aspect ratio, but since
moving to the new aspect ratio, it was no longer necessary, so it has
been corrected.
---
 reproducible-paper.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'reproducible-paper.tex')

diff --git a/reproducible-paper.tex b/reproducible-paper.tex
index 9b98c7e..a44e352 100644
--- a/reproducible-paper.tex
+++ b/reproducible-paper.tex
@@ -108,7 +108,7 @@
       \arxivlink{1801.08200}.
     \end{tcolorbox}
     \pause
-    \begin{tcolorbox}[title=Schroedinger's code: source code availability and link persistence\\ in astrophysics]
+    \begin{tcolorbox}[title=Schroedinger's code: source code availability and link persistence in astrophysics]
       ``We were \alert{unable to find source code} online ... for
       $40.4\%$ of the codes used in the research we looked at''. From
       Allen+2018, \arxivlink{1801.02094}.
-- 
cgit v1.2.1

