From 1637cce6617314de545dcb3b38f480f6a64c96e2 Mon Sep 17 00:00:00 2001
From: Mohammad Akhlaghi <mohammad@akhlaghi.org>
Date: Thu, 4 Jun 2020 17:15:23 +0100
Subject: Scale element in includegraphics for roughly similar-sized figures

Until now, when the figures were built directly from EPS
('\newcommand{\makepdf}{}' was commented), they would take the full
line-width becoming a little too large! I noticed this after letting arXiv
build the PDF.

With this commit, the 'includetikz' tool takes a second argument to be a
parameter given to 'includegraphics' (which is scale in this case).
---
 tex/src/preamble-pgfplots.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'tex/src/preamble-pgfplots.tex')

diff --git a/tex/src/preamble-pgfplots.tex b/tex/src/preamble-pgfplots.tex
index eabdeb7..05e73b7 100644
--- a/tex/src/preamble-pgfplots.tex
+++ b/tex/src/preamble-pgfplots.tex
@@ -79,12 +79,12 @@
 %% from. Without this, TiKZ will use numbers based on the order of
 %% figures. These numbers can be hard to manage and they will also depend
 %% on order in the final PDF, so it will be very buggy to manage them.
-\newcommand{\includetikz}[1]{%
+\newcommand{\includetikz}[2]{%
   \ifdefined\makepdf%
     \tikzsetnextfilename{#1}%
     \input{tex/src/#1.tex}%
   \else
-    \includegraphics[width=\linewidth]{tex/tikz/#1.eps}
+    \includegraphics[#2]{tex/tikz/#1.eps}
   \fi
 }
 
-- 
cgit v1.2.1

